From f1e4ebdba3c05e1c5d83eeb338c62fc3227b1a1a Mon Sep 17 00:00:00 2001
From: Yann Herklotz <git@yannherklotz.com>
Date: Sun, 11 Apr 2021 15:58:09 +0100
Subject: Add new results

---
 evaluation.tex | 14 ++++++++++++++
 1 file changed, 14 insertions(+)

(limited to 'evaluation.tex')

diff --git a/evaluation.tex b/evaluation.tex
index 1e02c84..2e08031 100644
--- a/evaluation.tex
+++ b/evaluation.tex
@@ -25,6 +25,20 @@ We configured Polybench's parameters so that only integer types are used, since
 
 \subsection{RQ1: How fast is \vericert{}-generated hardware?}
 
+\begin{figure}\centering
+  \begin{tikzpicture}
+    \begin{axis}[
+      visualization depends on={value \thisrow{Name} \as \labela},
+      width=1\textwidth,
+      height=0.5\textwidth,
+      ]
+
+      \addplot[] table [x=benchmark,y=cycles,col sep=comma] {results/benchmark_results/vericert.csv};
+
+    \end{axis}
+  \end{tikzpicture}
+\end{figure}
+
 \begin{figure}\centering
 \begin{subfigure}[t]{0.48\textwidth}
 \definecolor{cyclecountcol}{HTML}{1b9e77}
-- 
cgit 

