From a65bdc9ee527e66cf07dd0c4dea21ad342b141b6 Mon Sep 17 00:00:00 2001
From: Yann Herklotz <git@yannherklotz.com>
Date: Fri, 16 Apr 2021 20:26:34 +0100
Subject: Add changes

---
 main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index eb4f0c6..d7583fc 100644
--- a/main.tex
+++ b/main.tex
@@ -141,7 +141,7 @@
 \begin{abstract}
   High-level synthesis (HLS), which refers to the automatic compilation of software into hardware, is rapidly gaining popularity.  In a world increasingly reliant on application-specific hardware accelerators, HLS promises hardware designs of comparable performance and energy efficiency to those coded by hand in a hardware description language such as Verilog, while maintaining the convenience and the rich ecosystem of software development.  However, current HLS tools cannot always guarantee that the hardware designs they produce are equivalent to the software they were given, thus undermining any reasoning conducted at the software level.  Worse, there is mounting evidence that existing HLS tools are quite unreliable, sometimes generating wrong hardware or crashing when given valid inputs.
 
-  To address this problem, we present the first HLS tool that is mechanically verified to preserve the behaviour of its input software.  Our tool, called \vericert{}, extends the \compcert{} verified C compiler with a new hardware-oriented intermediate language and a Verilog back end, and has been proven correct in Coq. \vericert{} supports most C constructs, including all integer operations, function calls, local arrays, structs and unions and general control-flow statements.  An evaluation on the PolyBench/C benchmark suite indicates that \vericert{} generates hardware that is around an order of magnitude slower (only around 2$\times$ slower in the absence of division) and about the same size as hardware generated by an existing, optimising (but unverified) HLS tool.
+  To address this problem, we present the first HLS tool that is mechanically verified to preserve the behaviour of its input software.  Our tool, called \vericert{}, extends the \compcert{} verified C compiler with a new hardware-oriented intermediate language and a Verilog back end, and has been proven correct in Coq. \vericert{} supports most C constructs, including all integer operations, function calls, local arrays, structs, unions and general control-flow statements.  An evaluation on the PolyBench/C benchmark suite indicates that \vericert{} generates hardware that is around an order of magnitude slower (only around 2$\times$ slower in the absence of division) and about the same size as hardware generated by an existing, optimising (but unverified) HLS tool.
 \end{abstract}
 
 %% 2012 ACM Computing Classification System (CSS) concepts
-- 
cgit 

